Scale chr1:

GENCODE v24 RefSeq Curated NONHSAG000001.2 NONCODE_v5_RNA

GTEx

RepeatMasker

1 kb hg38 12,000 12,500 13,000 13,500 14,000 GENCODE v24 Comprehensive Transcript Set (only Basic displayed by default) RefSeq gene predictions from NCBI NONCODE_v5_Gene NONCODE_v5_lncRNA OMIM Allelic Variants Gene Expression in 53 tissues from GTEx RNA-seq of 8555 samples (570 donors) H3K27Ac Mark (Often Found Near Regulatory Elements) on 7 cell lines from ENCODE

DNase I Hypersensitivity Peak Clusters from ENCODE (95 cell types) Repeating Elements by RepeatMasker

No such file or directory Can’t open /gbdb/hg38/bbi/wgEncodeReg/wgEncodeRegMarkH3k27ac/wgEncodeBroadHistoneGm12878H3k27acStdSig.bigWig to read

Layered H3K27Ac