Scale chr21:

2 kb hg19 33,033,000 33,034,000 33,035,000 33,036,000 33,037,000 33,038,000 33,039,000 33,040,000 33,041,000 UCSC Genes (RefSeq, GenBank, CCDS, Rfam, tRNAs & Comparative Genomics) BC041449 SOD1